/*
Warnings:
- The primary key for the `settings` table will be changed. If it partially fails, the table could be left without primary key constraint.
- You are about to drop the column `id` on the `settings` table. All the data in the column will be lost.
*/
-- AlterTable
ALTER TABLE `Settings`
DROP PRIMARY KEY,
DROP COLUMN `id`,
ADD PRIMARY KEY (`key`);